Centrality class

0-100% 2-20% 20-40% 40-60% 60-100%

(nb) 〉 coll mult

N〈/_{W←μ}σ

20 22 24 26 28 30 32 34 36 = 5.02 TeV NNs ALICE, p-Pb > 10 GeV/c μ Tp < 3.53 cms y 2.03 <

Global uncertainty: 4.3%